0.2 0.4 0.6 0.8 1 1.5 2 18 ≤ _{trk} N c < 0.5 GeV/ Tk 0.15 < = 13 TeV s ALICE pp

0.2 0.4 0.6 0.8 1 1.5 2 30 ≤ _{trk} N 18 < c < 0.5 GeV/ Tk 0.15 < _− K^−K⊕^+K^+K

0.2 0.4 0.6 0.8 1 1.5 2 > 30 trkN c < 0.5 GeV/ Tk 0.15 <

< 0.3 TS

0.2 0.4 0.6 0.8 1 1.5 2 18 ≤ _{trk} N c < 1.2 GeV/ Tk 0.5 <

data PYTHIA 8 2nd-order pol. fit

0.2 0.4 0.6 0.8 1 1.5 2 30 ≤ _{trk} N 18 < c < 1.2 GeV/ Tk 0.5 <

0.2 0.4 0.6 0.8 1 1.5 2 > 30 trkN c < 1.2 GeV/ Tk 0.5 <

)c (GeV/ invq

)_{inv}q(C

ALI-PUB-562732

ALI-PUB-562732